daVinci V2.0.3

3.1.2.1 built by airport authority for radio equipment

3.1.2 earth bank in overrun path

3.1.1 AC overruns RWY

3.1 AC hits earth bank

3.2 AC burns

3 damage to AC

2.1.1 smoke in cabin

2.1.2.2.1 ?????

2.1.2.2 unnoticed during evacuation

2.1.2.1 unconsciousness

2.1.2 remained in cabin

2.1 asphyxiation

2 death of 2nd person 1 death of 1st person

0 accident